export interface ScanlineFieldProps {
  intensity?: "soft" | "medium" | "hard";
  size?: "sm" | "md" | "lg";
  tone?: "neutral" | "accent" | "warning";
}

export function ScanlineField({
  intensity = "medium",
  size = "md",
  tone = "neutral",
}: ScanlineFieldProps) {
  return (
    <div
      className="scanline-field"
      data-intensity={intensity}
      data-size={size}
      data-tone={tone}
      aria-hidden="true"
    />
  );
}
